                                        2/10/99

          PY482

Prepare a 5 minute presentation on
a specific accelerator. Please
address the following issues :

1)Name ALL accelerators at the site
2)For the specific accelerator :
       - types of beam
       - beam energy
       - # of bunches in the machine
       - the design luminosity
       - numbers of interaction points
       - number of detectors
       - components of the accelerator
         including a brief description
       of each component

Choose from the following :

 DESY - HERA (in Hamburg, Germany)

 CERN - LEP  (in Geneva, Switzerland)
 SLAC - SLC  (in Stanford, California)
 CORNELL, CESR (in Ithaca, NY)